-- Change default storage backend from 'minio' to 'filesystem'.
ALTER TABLE item_files ALTER COLUMN storage_backend SET DEFAULT 'filesystem';
ALTER TABLE revisions ALTER COLUMN file_storage_backend SET DEFAULT 'filesystem';
